Separated RL and RT , Longitudinal and Transverse Response functions. From Allison Lung’s thesis. Table 22.

W^2 RT /G^2_D �(Stat.) �(Total) RL/G^2_D �(Stat.) �(Total) (GeV^2) [nb/(sr�GeV)] [nb/(sr�GeV)]

Q^2 = 1.75 E0(20ffi) = 3.809 0.715 0.62E+01 0.24E+00 0.25E+00 0.16E+00 0.33E+00 0.35E+00 0.745 0.81E+01 0.19E+00 0.23E+00 0.44E+00 0.28E+00 0.33E+00 0.775 0.10E+02 0.16E+00 0.23E+00 0.49E+00 0.25E+00 0.34E+00 0.805 0.13E+02 0.15E+00 0.24E+00 0.16E+01 0.26E+00 0.38E+00 0.835 0.15E+02 0.14E+00 0.27E+00 0.19E+01 0.26E+00 0.42E+00 0.865 0.17E+02 0.23E+00 0.34E+00 0.23E+01 0.41E+00 0.55E+00 0.895 0.17E+02 0.30E+00 0.37E+00 0.25E+01 0.49E+00 0.59E+00 0.925 0.16E+02 0.14E+00 0.29E+00 0.24E+01 0.27E+00 0.44E+00 0.955 0.15E+02 0.13E+00 0.26E+00 0.19E+01 0.24E+00 0.40E+00 0.985 0.12E+02 0.12E+00 0.25E+00 0.16E+01 0.22E+00 0.36E+00 1.015 0.10E+02 0.12E+00 0.22E+00 0.12E+01 0.21E+00 0.32E+00 1.045 0.85E+01 0.12E+00 0.19E+00 0.99E+00 0.21E+00 0.28E+00 1.075 0.74E+01 0.13E+00 0.18E+00 0.66E+00 0.21E+00 0.26E+00 1.105 0.64E+01 0.12E+00 0.16E+00 0.82E+00 0.19E+00 0.24E+00 1.135 0.61E+01 0.12E+00 0.15E+00 0.30E+00 0.19E+00 0.23E+00 1.165 0.57E+01 0.12E+00 0.15E+00 0.59E+00 0.20E+00 0.24E+00 1.195 0.61E+01 0.15E+00 0.18E+00 0.37E-01 0.24E+00 0.27E+00

Q^2 = 2.50 E0(20ffi) = 5.016 0.520 0.24E+01 0.28E+00 0.29E+00 0.16E+00 0.33E+00 0.34E+00 0.560 0.30E+01 0.22E+00 0.22E+00 0.30E+00 0.26E+00 0.27E+00 0.600 0.38E+01 0.19E+00 0.20E+00 0.49E+00 0.24E+00 0.26E+00 0.640 0.51E+01 0.19E+00 0.21E+00 0.72E+00 0.24E+00 0.27E+00 0.680 0.73E+01 0.18E+00 0.22E+00 0.23E+00 0.24E+00 0.30E+00

W^2 RT /G^2_D �(Stat.) �(Total) RL/G^2_D �(Stat.) �(Total) (GeV^2) [nb/(sr�GeV)] [nb/(sr�GeV)]

0.720 0.98E+01 0.18E+00 0.24E+00 0.15E-01 0.26E+00 0.34E+00 0.760 0.13E+02 0.19E+00 0.27E+00 0.32E+00 0.28E+00 0.40E+00 0.800 0.16E+02 0.19E+00 0.31E+00 0.26E+00 0.30E+00 0.46E+00 0.840 0.18E+02 0.21E+00 0.35E+00 0.13E+01 0.34E+00 0.52E+00 0.880 0.19E+02 0.43E+00 0.52E+00 0.15E+01 0.71E+00 0.83E+00 0.920 0.20E+02 0.25E+00 0.38E+00 0.67E+00 0.40E+00 0.58E+00 0.960 0.17E+02 0.23E+00 0.34E+00 0.17E+01 0.35E+00 0.51E+00 1.000 0.15E+02 0.24E+00 0.32E+00 0.19E+01 0.33E+00 0.46E+00 1.040 0.13E+02 0.24E+00 0.32E+00 0.12E+01 0.32E+00 0.43E+00 1.080 0.11E+02 0.25E+00 0.31E+00 0.11E+01 0.31E+00 0.40E+00 1.120 0.10E+02 0.25E+00 0.30E+00 0.49E+00 0.31E+00 0.38E+00 1.160 0.94E+01 0.23E+00 0.27E+00 0.54E+00 0.29E+00 0.36E+00 1.200 0.94E+01 0.23E+00 0.27E+00 0.87E+00 0.30E+00 0.37E+00 1.240 0.10E+02 0.26E+00 0.30E+00 0.57E+00 0.35E+00 0.41E+00

Q^2 = 3.25 E0(20ffi) = 5.920 0.475 0.32E+01 0.62E+00 0.63E+00 -0.11E+00 0.81E+00 0.82E+00 0.525 0.43E+01 0.56E+00 0.57E+00 -0.32E+00 0.71E+00 0.72E+00 0.575 0.55E+01 0.52E+00 0.53E+00 0.53E-01 0.66E+00 0.67E+00 0.625 0.71E+01 0.41E+00 0.42E+00 0.34E+00 0.54E+00 0.57E+00 0.675 0.96E+01 0.36E+00 0.39E+00 0.60E+00 0.51E+00 0.55E+00 0.725 0.12E+02 0.33E+00 0.39E+00 0.12E+01 0.51E+00 0.58E+00 0.775 0.16E+02 0.32E+00 0.41E+00 0.67E+00 0.52E+00 0.64E+00 0.825 0.19E+02 0.32E+00 0.45E+00 0.71E+00 0.54E+00 0.70E+00 0.875 0.21E+02 0.48E+00 0.59E+00 0.23E+01 0.86E+00 0.10E+01 0.925 0.20E+02 0.33E+00 0.47E+00 0.22E+01 0.55E+00 0.74E+00 0.975 0.19E+02 0.29E+00 0.43E+00 0.15E+01 0.48E+00 0.66E+00 1.025 0.17E+02 0.28E+00 0.40E+00 0.17E+01 0.45E+00 0.61E+00 1.075 0.15E+02 0.29E+00 0.39E+00 0.16E+01 0.43E+00 0.56E+00

W^2 RT /G^2_D �(Stat.) �(Total) RL/G^2_D �(Stat.) �(Total) (GeV^2) [nb/(sr�GeV)] [nb/(sr�GeV)]

1.125 0.13E+02 0.31E+00 0.39E+00 0.18E+01 0.44E+00 0.55E+00 1.175 0.13E+02 0.35E+00 0.41E+00 0.12E+01 0.49E+00 0.58E+00 1.225 0.14E+02 0.36E+00 0.43E+00 0.51E+00 0.52E+00 0.61E+00 1.275 0.15E+02 0.37E+00 0.44E+00 0.71E+00 0.57E+00 0.66E+00 1.325 0.16E+02 0.40E+00 0.47E+00 0.66E+00 0.65E+00 0.74E+00 1.375 0.17E+02 0.46E+00 0.54E+00 0.21E+01 0.75E+00 0.85E+00

Q^2 = 4.00 E0(20ffi) = 6.742 0.425 0.04E+02 0.80E+00 0.81E+00 -0.53E+00 0.14E+01 0.14E+01 0.475 0.05E+02 0.76E+00 0.77E+00 -0.18E+01 0.10E+01 0.10E+01 0.525 0.06E+02 0.73E+00 0.75E+00 -0.73E+00 0.98E+00 0.99E+00 0.575 0.08E+02 0.70E+00 0.72E+00 -0.29E+00 0.93E+00 0.95E+00 0.625 0.10E+02 0.69E+00 0.73E+00 -0.45E+00 0.92E+00 0.95E+00 0.675 0.11E+02 0.68E+00 0.71E+00 0.13E+01 0.92E+00 0.97E+00 0.725 0.15E+02 0.69E+00 0.74E+00 0.11E+01 0.94E+00 0.10E+01 0.775 0.18E+02 0.68E+00 0.76E+00 0.29E+00 0.96E+00 0.11E+01 0.825 0.21E+02 0.67E+00 0.78E+00 0.17E+00 0.95E+00 0.11E+01 0.875 0.22E+02 0.77E+00 0.87E+00 0.91E+00 0.12E+01 0.14E+01 0.925 0.23E+02 0.68E+00 0.80E+00 0.17E+01 0.98E+00 0.12E+01 0.975 0.21E+02 0.63E+00 0.75E+00 0.19E+01 0.90E+00 0.11E+01 1.025 0.20E+02 0.62E+00 0.72E+00 0.17E+01 0.87E+00 0.10E+01 1.075 0.18E+02 0.60E+00 0.69E+00 0.19E+01 0.84E+00 0.97E+00 1.125 0.16E+02 0.60E+00 0.67E+00 0.26E+01 0.83E+00 0.94E+00 1.175 0.16E+02 0.62E+00 0.69E+00 0.27E+01 0.87E+00 0.97E+00 1.225 0.17E+02 0.68E+00 0.75E+00 0.10E+01 0.95E+00 0.11E+01 1.275 0.17E+02 0.70E+00 0.77E+00 0.32E+01 0.10E+01 0.11E+01 1.425 0.23E+02 0.81E+00 0.92E+00 0.12E+01 0.13E+01 0.14E+01 1.475 0.24E+02 0.90E+00 0.10E+01 0.38E+01 0.14E+01 0.16E+01