x_{Bj}

Q^2(GeV^2)

2.75^o

5.5^o

10.5^o

E155X kinematic coverage by spectrometer (E_0 = 29 GeV)

2 4 6 8 10 12 14 16 18 20

10^{-2} 10^{-1} 1