TABLE I. Results for Ã_⊥ with statistical and systematic errors for proton and deuteron at the measured x and Q^2 [GeV^2]. Also shown are the additive and multiplicative radiative corrections

x < Q^2 > Ã_⊥^p f^p_{RC} A^p_{RC} Ã_⊥^d f^d_{RC} A^d_{RC} θ ≈ 2.75^∘; E=29.1 GeV 0.017 0.63 8.611 ± 4.785±0.456 0.811 -0.001 5.545 ± 4.476±0.346 0.877 0.000 0.020 0.71 0.025 ± 0.015±0.001 0.841 -0.001 0.018 ± 0.022±0.001 0.896 0.000 0.022 0.76 0.004 ± 0.007±0.000 0.861 -0.001 −0.006 ± 0.010±0.001 0.909 0.000 0.024 0.82 0.000 ± 0.005±0.000 0.880 -0.001 −0.003 ± 0.008±0.000 0.922 0.000 0.027 0.86 0.008 ± 0.005±0.000 0.904 -0.001 −0.007 ± 0.008±0.001 0.937 0.000 0.031 0.91 0.001 ± 0.005±0.000 0.921 -0.001 0.006 ± 0.008±0.000 0.948 0.000 0.035 0.96 −0.002 ± 0.005±0.000 0.935 -0.001 0.008 ± 0.008±0.001 0.957 0.000 0.039 1.02 −0.011 ± 0.005±0.001 0.946 -0.001 0.000 ± 0.008±0.000 0.957 0.000 0.044 1.07 −0.015 ± 0.005±0.001 0.954 -0.001 0.008 ± 0.007±0.001 0.970 0.000 0.049 1.13 −0.008 ± 0.005±0.000 0.962 -0.001 −0.003 ± 0.007±0.000 0.975 -0.001 0.056 1.18 −0.004 ± 0.005±0.000 0.967 -0.001 0.009 ± 0.007±0.001 0.978 -0.001 0.063 1.23 −0.005 ± 0.005±0.000 0.971 -0.002 0.008 ± 0.007±0.001 0.981 -0.001 0.071 1.29 −0.010 ± 0.005±0.001 0.975 -0.002 0.010 ± 0.007±0.001 0.984 -0.001 0.079 1.34 −0.002 ± 0.005±0.000 0.979 -0.002 −0.004 ± 0.007±0.000 0.986 -0.001 0.089 1.40 −0.004 ± 0.005±0.000 0.981 -0.002 −0.006 ± 0.007±0.000 0.987 -0.001 0.101 1.45 0.006 ± 0.005±0.001 0.982 -0.002 0.007 ± 0.007±0.001 0.989 -0.001 0.113 1.50 0.002 ± 0.005±0.001 0.986 -0.002 −0.019 ± 0.007±0.001 0.990 -0.001 0.128 1.54 −0.005 ± 0.005±0.001 0.985 -0.002 0.002 ± 0.008±0.000 0.991 -0.001 0.144 1.59 −0.007 ± 0.005±0.001 0.986 -0.002 0.004 ± 0.008±0.000 0.991 -0.001 0.162 1.63 −0.003 ± 0.005±0.000 0.987 -0.002 0.002 ± 0.008±0.000 0.991 -0.001 0.182 1.67 −0.002 ± 0.005±0.000 0.987 -0.002 −0.007 ± 0.008±0.000 0.991 -0.001 0.205 1.71 0.009 ± 0.005±0.001 0.988 -0.002 0.000 ± 0.009±0.000 0.991 -0.001 0.230 1.74 −0.008 ± 0.006±0.001 0.987 -0.002 −0.003 ± 0.009±0.000 0.991 -0.001 0.259 1.77 0.001 ± 0.006±0.000 0.987 -0.002 −0.009 ± 0.009±0.001 0.991 -0.001 0.292 1.80 −0.011 ± 0.006±0.001 0.986 -0.002 0.003 ± 0.010±0.000 0.990 -0.001 0.329 1.83 −0.009 ± 0.006±0.001 0.983 -0.002 0.009 ± 0.010±0.001 0.989 -0.001 θ ≈ 5.5^∘; E=29.1 GeV 0.065 2.32 −0.013 ± 0.053±0.001 0.951 0.002 −0.023 ± 0.076±0.001 0.965 0.001 0.071 2.49 0.018 ± 0.022±0.001 0.958 0.003 0.042 ± 0.032±0.003 0.970 0.001 0.080 2.71 0.010 ± 0.014±0.001 0.967 0.003 0.049 ± 0.021±0.003 0.977 0.001 0.090 2.94 −0.011 ± 0.011±0.001 0.975 0.003 −0.008 ± 0.016±0.001 0.982 0.002 0.101 3.17 −0.004 ± 0.009±0.000 0.981 0.003 −0.010 ± 0.014±0.001 0.986 0.002 0.114 3.40 0.021 ± 0.008±0.001 0.986 0.003 −0.013 ± 0.013±0.001 0.989 0.002 0.128 3.62 0.011 ± 0.008±0.001 0.989 0.003 0.000 ± 0.012±0.000 0.992 0.002 0.144 3.85 −0.017 ± 0.008±0.001 0.991 0.003 0.004 ± 0.012±0.000 0.994 0.002 0.162 4.08 −0.016 ± 0.007±0.001 0.994 0.003 0.000 ± 0.011±0.000 0.995 0.002 0.182 4.31 −0.009 ± 0.007±0.001 0.995 0.003 0.017 ± 0.012±0.001 0.996 0.002 0.205 4.53 −0.010 ± 0.008±0.001 0.996 0.003 0.021 ± 0.012±0.001 0.997 0.002 0.231 4.74 −0.020 ± 0.008±0.001 0.997 0.003 −0.002 ± 0.013±0.000 0.998 0.002 0.259 4.94 0.004 ± 0.009±0.001 0.998 0.003 0.001 ± 0.014±0.001 0.998 0.002 0.292 5.14 −0.018 ± 0.009±0.001 0.998 0.003 −0.027 ± 0.015±0.002 0.999 0.001 0.328 5.32 −0.018 ± 0.010±0.001 0.998 0.002 0.008 ± 0.016±0.001 0.999 0.001 0.370 5.50 −0.048 ± 0.011±0.002 0.998 0.002 0.011 ± 0.018±0.001 0.999 0.001 0.416 5.66 −0.025 ± 0.012±0.001 0.999 0.002 −0.034 ± 0.020±0.002 0.999 0.001 0.468 5.82 −0.049 ± 0.013±0.003 0.998 0.002 0.020 ± 0.023±0.001 0.999 0.002 0.527 5.96 −0.034 ± 0.015±0.002 0.998 0.003 0.003 ± 0.027±0.000 0.998 0.002 0.592 6.09 −0.027 ± 0.018±0.001 0.997 0.003 −0.012 ± 0.033±0.001 0.998 0.003 0.667 6.20 −0.050 ± 0.022±0.003 0.995 0.001 −0.029 ± 0.041±0.002 0.996 0.001 0.750 6.31 −0.089 ± 0.029±0.005 0.990 0.001 0.025 ± 0.054±0.002 0.992 0.002 0.844 6.40 −0.088 ± 0.047±0.004 0.961 0.004 0.057 ± 0.076±0.004 0.972 0.004 θ ≈ 10.5^∘; E=29.1 GeV 0.129 5.36 −0.052 ± 0.031±0.003 0.963 -0.005 −0.028 ± 0.053±0.002 0.972 -0.002 0.144 5.89 −0.071 ± 0.025±0.004 0.970 -0.005 0.040 ± 0.045±0.003 0.977 -0.002 0.162 6.49 0.006 ± 0.022±0.001 0.977 -0.005 −0.015 ± 0.039±0.001 0.983 -0.002 0.182 7.17 0.012 ± 0.020±0.001 0.981 -0.005 0.045 ± 0.036±0.003 0.986 -0.003 0.205 7.91 −0.021 ± 0.020±0.001 0.986 -0.005 0.007 ± 0.036±0.001 0.989 -0.003 0.231 8.67 0.020 ± 0.021±0.001 0.989 -0.005 0.005 ± 0.039±0.001 0.992 -0.002 0.259 9.39 −0.025 ± 0.022±0.002 0.992 -0.005 −0.044 ± 0.043±0.003 0.993 -0.002 0.292 10.18 0.029 ± 0.024±0.002 0.993 -0.004 −0.040 ± 0.047±0.003 0.995 -0.002 0.328 10.96 −0.028 ± 0.026±0.002 0.995 -0.004 0.069 ± 0.053±0.005 0.996 -0.002 0.369 11.78 −0.014 ± 0.029±0.002 0.997 -0.004 −0.088 ± 0.061±0.006 0.997 -0.002 0.415 12.57 0.004 ± 0.034±0.002 0.997 -0.003 −0.027 ± 0.072±0.003 0.997 -0.002 0.467 13.36 0.067 ± 0.041±0.004 0.998 -0.003 −0.014 ± 0.088±0.003 0.998 -0.002 0.526 14.19 0.032 ± 0.051±0.002 0.998 -0.002 −0.026 ± 0.114±0.002 0.999 -0.002 0.592 15.02 0.052 ± 0.067±0.003 0.999 -0.002 0.137 ± 0.158±0.008 0.999 -0.002 0.666 15.77 −0.195 ± 0.094±0.010 0.999 -0.002 −0.045 ± 0.229±0.003 0.999 -0.002 0.749 16.48 0.114 ± 0.142±0.006 0.999 -0.002 −0.035 ± 0.347±0.002 0.999 -0.002 0.845 17.10 0.299 ± 0.259±0.015 0.997 -0.002 −1.237 ± 0.588±0.077 0.998 -0.003 θ ≈ 2.75^∘; E=32.3 GeV 0.018 0.75 0.071 ± 0.081±0.004 0.820 -0.001 −0.047 ± 0.110±0.003 0.882 0.000 0.020 0.81 −0.002 ± 0.009±0.000 0.835 -0.001 −0.010 ± 0.014±0.001 0.892 0.000 0.022 0.87 0.000 ± 0.005±0.000 0.861 -0.001 0.002 ± 0.008±0.000 0.908 0.000 0.024 0.93 −0.006 ± 0.005±0.000 0.883 -0.001 0.009 ± 0.008±0.001 0.925 0.000 0.027 0.99 0.003 ± 0.004±0.000 0.909 -0.001 −0.003 ± 0.008±0.000 0.939 0.000

0.031 1.05 0.000 ± 0.004±0.000 0.925 -0.001 0.007 ± 0.008±0.000 0.950 0.000 0.035 1.12 −0.004 ± 0.004±0.000 0.938 -0.001 −0.001 ± 0.008±0.000 0.959 0.000 0.039 1.19 −0.001 ± 0.004±0.000 0.938 -0.001 −0.001 ± 0.007±0.000 0.967 0.000 0.044 1.25 −0.004 ± 0.004±0.000 0.959 -0.001 −0.011 ± 0.007±0.001 0.973 0.000 0.049 1.32 0.000 ± 0.004±0.000 0.966 -0.001 −0.008 ± 0.007±0.000 0.977 0.000 0.056 1.39 −0.003 ± 0.004±0.000 0.968 -0.002 0.000 ± 0.007±0.000 0.981 -0.001 0.063 1.46 −0.008 ± 0.004±0.000 0.977 -0.002 −0.002 ± 0.007±0.000 0.983 -0.001 0.071 1.54 −0.006 ± 0.004±0.000 0.980 -0.002 −0.009 ± 0.007±0.001 0.987 -0.001 0.079 1.61 0.004 ± 0.004±0.000 0.982 -0.002 −0.002 ± 0.007±0.000 0.988 -0.001 0.089 1.68 −0.003 ± 0.004±0.000 0.985 -0.002 0.011 ± 0.007±0.001 0.990 -0.001 0.101 1.74 −0.005 ± 0.004±0.000 0.988 -0.002 0.001 ± 0.007±0.000 0.991 -0.001 0.113 1.81 −0.003 ± 0.005±0.000 0.988 -0.002 0.000 ± 0.007±0.000 0.992 -0.001 0.128 1.87 −0.003 ± 0.005±0.000 0.989 -0.002 −0.003 ± 0.008±0.000 0.993 -0.001 0.144 1.93 −0.002 ± 0.005±0.000 0.991 -0.002 −0.014 ± 0.008±0.001 0.994 -0.001 0.162 1.98 −0.007 ± 0.005±0.001 0.992 -0.002 −0.001 ± 0.008±0.000 0.994 -0.001 0.182 2.03 0.010 ± 0.005±0.001 0.993 -0.002 −0.004 ± 0.008±0.000 0.994 -0.001 0.205 2.08 −0.003 ± 0.005±0.000 0.992 -0.002 −0.008 ± 0.009±0.001 0.994 -0.001 0.230 2.13 0.004 ± 0.005±0.000 0.992 -0.002 −0.001 ± 0.009±0.000 0.994 -0.001 0.259 2.17 0.007 ± 0.005±0.000 0.992 -0.002 −0.008 ± 0.009±0.001 0.994 -0.001 0.292 2.21 0.002 ± 0.006±0.000 0.992 -0.002 0.009 ± 0.010±0.001 0.994 -0.001 0.329 2.26 −0.004 ± 0.006±0.000 0.990 -0.002 0.001 ± 0.010±0.000 0.993 -0.001 θ ≈ 5.5^∘; E=32.3 GeV 0.059 2.48 −0.685 ± 0.248±0.035 0.940 0.002 0.205 ± 0.369±0.013 0.957 0.001 0.064 2.65 0.008 ± 0.029±0.001 0.949 0.002 0.022 ± 0.043±0.001 0.963 0.001 0.071 2.87 −0.019 ± 0.015±0.001 0.959 0.003 0.026 ± 0.023±0.002 0.969 0.001 0.080 3.13 0.004 ± 0.011±0.001 0.968 0.003 0.016 ± 0.017±0.001 0.976 0.001 0.090 3.41 0.004 ± 0.009±0.000 0.974 0.003 −0.005 ± 0.013±0.000 0.981 0.002 0.101 3.67 −0.012 ± 0.008±0.001 0.981 0.003 −0.005 ± 0.012±0.000 0.986 0.002 0.113 3.95 0.000 ± 0.007±0.001 0.985 0.003 −0.004 ± 0.011±0.000 0.989 0.002 0.128 4.22 −0.002 ± 0.007±0.001 0.991 0.003 0.011 ± 0.010±0.001 0.992 0.002 0.144 4.51 −0.005 ± 0.007±0.001 0.992 0.003 0.014 ± 0.010±0.001 0.994 0.002 0.162 4.79 0.002 ± 0.007±0.001 0.994 0.003 0.000 ± 0.010±0.000 0.995 0.002 0.182 5.07 −0.005 ± 0.007±0.001 0.995 0.003 0.002 ± 0.011±0.000 0.997 0.002 0.205 5.34 −0.003 ± 0.007±0.001 0.997 0.003 −0.001 ± 0.011±0.000 0.997 0.002 0.230 5.60 −0.023 ± 0.007±0.001 0.997 0.003 −0.006 ± 0.012±0.001 0.998 0.002 0.259 5.86 −0.007 ± 0.008±0.001 0.998 0.003 −0.001 ± 0.013±0.001 0.998 0.001 0.292 6.11 −0.022 ± 0.008±0.001 0.998 0.002 0.016 ± 0.014±0.001 0.999 0.001 0.328 6.34 −0.008 ± 0.009±0.001 0.999 0.002 −0.034 ± 0.015±0.002 0.999 0.001 0.370 6.57 −0.034 ± 0.010±0.002 0.999 0.002 −0.025 ± 0.017±0.002 0.999 0.001 0.416 6.79 −0.022 ± 0.011±0.001 0.999 0.002 −0.023 ± 0.019±0.002 0.999 0.001 0.468 6.99 −0.037 ± 0.012±0.002 0.999 0.002 −0.001 ± 0.022±0.001 0.999 0.001 0.527 7.19 −0.030 ± 0.014±0.002 0.999 0.002 −0.014 ± 0.026±0.001 0.999 0.002 0.592 7.36 −0.032 ± 0.016±0.002 0.998 0.003 −0.029 ± 0.032±0.002 0.999 0.002 0.667 7.53 −0.023 ± 0.020±0.001 0.997 0.005 −0.019 ± 0.041±0.001 0.998 0.004 0.750 7.66 −0.053 ± 0.026±0.003 0.994 0.002 0.040 ± 0.053±0.002 0.995 0.002 0.844 7.78 0.046 ± 0.042±0.002 0.980 0.003 −0.127 ± 0.074±0.008 0.983 0.003 θ ≈ 10.5^∘; E=32.3 GeV 0.129 6.09 −0.014 ± 0.025±0.001 0.962 -0.005 0.010 ± 0.038±0.001 0.971 -0.002 0.144 6.71 0.014 ± 0.019±0.001 0.969 -0.006 −0.005 ± 0.031±0.001 0.977 -0.002 0.162 7.41 −0.036 ± 0.016±0.002 0.977 -0.005 −0.048 ± 0.027±0.003 0.982 -0.002 0.182 8.21 −0.017 ± 0.015±0.002 0.982 -0.005 −0.005 ± 0.024±0.001 0.986 -0.002 0.205 9.06 −0.024 ± 0.015±0.002 0.986 -0.005 0.027 ± 0.025±0.002 0.989 -0.002 0.230 9.93 −0.012 ± 0.016±0.001 0.989 -0.005 −0.024 ± 0.026±0.002 0.991 -0.002 0.259 10.77 −0.005 ± 0.017±0.001 0.992 -0.005 −0.010 ± 0.029±0.001 0.993 -0.002 0.292 11.70 0.026 ± 0.018±0.002 0.994 -0.004 0.009 ± 0.032±0.001 0.995 -0.002 0.328 12.64 −0.011 ± 0.020±0.002 0.995 -0.004 −0.008 ± 0.036±0.002 0.996 -0.002 0.369 13.61 0.036 ± 0.023±0.003 0.996 -0.004 0.043 ± 0.042±0.003 0.996 -0.002 0.415 14.55 0.016 ± 0.026±0.002 0.997 -0.003 0.060 ± 0.050±0.004 0.997 -0.002 0.467 15.56 −0.015 ± 0.031±0.003 0.998 -0.003 0.009 ± 0.062±0.003 0.998 -0.002 0.526 16.56 0.071 ± 0.038±0.004 0.998 -0.002 −0.125 ± 0.081±0.008 0.999 -0.001 0.591 17.55 0.045 ± 0.050±0.002 0.999 -0.002 0.023 ± 0.112±0.001 0.999 -0.002 0.666 18.49 −0.007 ± 0.070±0.000 0.999 -0.002 −0.188 ± 0.161±0.012 0.999 -0.002 0.749 19.45 0.094 ± 0.108±0.005 0.999 -0.002 0.338 ± 0.251±0.021 0.999 -0.002 0.844 20.45 0.309 ± 0.211±0.016 0.998 -0.002 0.240 ± 0.411±0.015 0.999 -0.003