x (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ (_{σA}

σ^d ) is ± δ

4He^9Be^{12}C^{27}Al^{40}Ca^{56}Fe^{108}Ag^{197}Au (Δ = ±2.2%) (Δ = ±0.5%) (Δ = ±0.5%) (Δ = ±0.5%) (Δ = ±0.7%) (Δ = ±0.9%) (Δ = ±1.0%) (Δ = ±2.3%)

0.084 · · · · · · · · · · · · · · · 1.015 ± 0.026 · · · · · · 0.094 · · · · · · · · · · · · · · · 0.980 ± 0.027 · · · · · · 0.125 1.030 ± 0.024 1.025 ± 0.017 · · · 1.036 ± 0.015 · · · 1.052 ± 0.015 · · · 1.064 ± 0.017 0.145 1.054 ± 0.039 1.077 ± 0.034 · · · 1.025 ± 0.028 · · · 1.022 ± 0.022 · · · 0.992 ± 0.030 0.205 0.996 ± 0.021 1.006 ± 0.014 1.010 ± 0.017 1.015 ± 0.013 1.040 ± 0.022 1.025 ± 0.013 1.015 ± 0.023 0.994 ± 0.015 0.235 0.997 ± 0.021 0.996 ± 0.015 0.989 ± 0.018 0.999 ± 0.014 0.980 ± 0.022 1.006 ± 0.014 0.986 ± 0.024 0.991 ± 0.016 0.265 1.031 ± 0.030 1.012 ± 0.025 1.068 ± 0.043 1.019 ± 0.025 0.995 ± 0.041 0.990 ± 0.021 0.938 ± 0.042 0.984 ± 0.029 0.295 1.004 ± 0.020 1.003 ± 0.013 1.001 ± 0.018 1.009 ± 0.013 1.037 ± 0.019 0.992 ± 0.010 1.030 ± 0.020 0.993 ± 0.015 0.325 0.991 ± 0.025 0.992 ± 0.020 1.004 ± 0.031 0.975 ± 0.020 0.996 ± 0.031 0.981 ± 0.017 0.998 ± 0.033 0.984 ± 0.024 0.360 0.998 ± 0.021 0.993 ± 0.014 0.987 ± 0.017 0.993 ± 0.013 1.004 ± 0.021 0.972 ± 0.012 1.012 ± 0.023 0.956 ± 0.014 0.400 0.968 ± 0.017 0.957 ± 0.009 0.974 ± 0.011 0.966 ± 0.009 0.966 ± 0.012 0.955 ± 0.009 0.968 ± 0.013 0.930 ± 0.010 0.440 0.949 ± 0.019 0.980 ± 0.014 0.975 ± 0.018 0.959 ± 0.012 0.960 ± 0.019 0.940 ± 0.012 0.957 ± 0.021 0.931 ± 0.014 0.480 0.954 ± 0.017 0.951 ± 0.011 0.953 ± 0.014 0.934 ± 0.010 0.954 ± 0.014 0.917 ± 0.009 0.926 ± 0.015 0.914 ± 0.011 0.520 0.951 ± 0.017 0.955 ± 0.011 0.926 ± 0.012 0.926 ± 0.010 0.912 ± 0.013 0.904 ± 0.009 0.897 ± 0.014 0.892 ± 0.011 0.560 0.943 ± 0.017 0.945 ± 0.011 0.924 ± 0.010 0.923 ± 0.009 0.915 ± 0.012 0.893 ± 0.009 0.891 ± 0.013 0.881 ± 0.011 0.600 0.928 ± 0.017 0.928 ± 0.010 0.905 ± 0.009 0.906 ± 0.009 0.904 ± 0.011 0.869 ± 0.008 0.881 ± 0.012 0.837 ± 0.010 0.640 0.935 ± 0.018 0.917 ± 0.011 0.903 ± 0.010 0.892 ± 0.009 0.895 ± 0.012 0.860 ± 0.009 0.842 ± 0.013 0.846 ± 0.011 0.680 0.917 ± 0.020 0.912 ± 0.013 0.888 ± 0.012 0.876 ± 0.011 0.870 ± 0.015 0.852 ± 0.010 0.842 ± 0.016 0.829 ± 0.013 0.720 0.930 ± 0.022 0.896 ± 0.015 0.861 ± 0.014 0.877 ± 0.012 0.880 ± 0.018 0.846 ± 0.011 0.830 ± 0.019 0.820 ± 0.014 0.760 0.949 ± 0.025 0.931 ± 0.019 0.870 ± 0.020 0.884 ± 0.016 0.890 ± 0.027 0.867 ± 0.015 0.818 ± 0.027 0.817 ± 0.018 0.800 0.927 ± 0.032 0.923 ± 0.027 0.972 ± 0.044 0.957 ± 0.025 0.977 ± 0.058 0.920 ± 0.024 0.941 ± 0.059 0.899 ± 0.030 0.840 0.954 ± 0.054 1.058 ± 0.051 · · · 1.079 ± 0.051 · · · 1.040 ± 0.047 · · · 0.975 ± 0.058 0.880 0.964 ± 0.120 1.135 ± 0.118 · · · 1.231 ± 0.127 · · · 1.192 ± 0.116 · · · 1.099 ± 0.142